-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.197633073332
cusum  =  0.114007262097
eta  =  0.497971972496
hl_amp_ratio  =  0.54773895798
kurtosis  =  -0.712053905719
n_points  =  442
period  =  0.645027199255
period_SNR  =  41.8265172434
period_log10FAP  =  -47.6536270168
period_uncertainty  =  0.000115546578376
phase_cusum  =  0.216551092619
phase_eta  =  0.562566837768
phi21  =  0.833799170729
phi31  =  2.10304394232
quartile31  =  0.2875
r21  =  0.434327922059
r31  =  0.215191851068
shapiro_w  =  0.951012849808
skewness  =  -0.344699478652
slope_per10  =  -0.126406935853
slope_per90  =  0.244058695558
stetson_k  =  0.791590813359
weighted_mean  =  13.8991996951
weighted_std  =  0.191237863635
