-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.32434156358
cusum  =  0.153943427736
eta  =  0.599499942442
hl_amp_ratio  =  0.789875902021
kurtosis  =  -0.0539355282115
n_points  =  207
period  =  0.694032418052
period_SNR  =  18.2786052016
period_log10FAP  =  -14.251394965
period_uncertainty  =  0.000105813757308
phase_cusum  =  0.276191026081
phase_eta  =  0.410100331797
phi21  =  -1.83245524238
phi31  =  -1.28813937981
quartile31  =  0.36
r21  =  0.641683107946
r31  =  0.477027811803
shapiro_w  =  0.971986234188
skewness  =  -0.448998478617
slope_per10  =  -0.193679857055
slope_per90  =  0.253800004721
stetson_k  =  0.780789677191
weighted_mean  =  12.1645410628
weighted_std  =  0.279854442851
