-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.352448730474
cusum  =  0.0728937397011
eta  =  0.636745359372
hl_amp_ratio  =  0.485167800912
kurtosis  =  -1.0034911154
n_points  =  444
period  =  0.606315214168
period_SNR  =  56.5701660665
period_log10FAP  =  -55.8660276302
period_uncertainty  =  0.000104042012374
phase_cusum  =  0.202786795241
phase_eta  =  0.481223958859
phi21  =  1.09154750036
phi31  =  2.38582479753
quartile31  =  0.53
r21  =  0.456807656253
r31  =  0.097375001822
shapiro_w  =  0.93872076273
skewness  =  -0.44051987137
slope_per10  =  -0.057442810212
slope_per90  =  0.079617687406
stetson_k  =  0.780453235611
weighted_mean  =  14.5560000112
weighted_std  =  0.3142918192
