<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.281216959361
cusum  =  0.154293361624
eta  =  0.474180133501
hl_amp_ratio  =  0.387322769732
kurtosis  =  -0.158636777464
n_points  =  314
period  =  0.691670724089
period_SNR  =  36.2599336724
period_log10FAP  =  -37.7635130555
period_uncertainty  =  0.000136381171604
phase_cusum  =  0.241871384631
phase_eta  =  0.297018983807
phi21  =  -2.43112403331
phi31  =  -1.51369694004
quartile31  =  0.3
r21  =  0.5110412601
r31  =  0.300515947198
shapiro_w  =  0.88232511282
skewness  =  -0.952539629444
slope_per10  =  -0.177607652117
slope_per90  =  0.236956760562
stetson_k  =  0.709649062929
weighted_mean  =  15.9173487814
weighted_std  =  0.234261919908
</pre></body></html>