-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.188947127524
cusum  =  0.135451629746
eta  =  0.704524380512
hl_amp_ratio  =  0.51437940397
kurtosis  =  -1.14350063512
n_points  =  314
period  =  0.366499580554
period_SNR  =  59.9760006803
period_log10FAP  =  -52.1169609415
period_uncertainty  =  6.1134209875e-05
phase_cusum  =  0.267820607785
phase_eta  =  0.249452199877
phi21  =  -0.824693293179
phi31  =  0.460155450132
quartile31  =  0.2475
r21  =  0.0296330535079
r31  =  0.0602384563238
shapiro_w  =  0.943199217319
skewness  =  -0.205189989266
slope_per10  =  -0.100680510059
slope_per90  =  0.131174755513
stetson_k  =  0.838680740737
weighted_mean  =  15.3403240541
weighted_std  =  0.137901230534
