-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.327442550319
cusum  =  0.08130061171
eta  =  0.608275883995
hl_amp_ratio  =  0.356331043064
kurtosis  =  -0.99696851807
n_points  =  341
period  =  0.620316182684
period_SNR  =  42.5880389493
period_log10FAP  =  -46.0629429576
period_uncertainty  =  0.00010707660713
phase_cusum  =  0.255242221262
phase_eta  =  0.163377555766
phi21  =  0.844561371665
phi31  =  1.87507586362
quartile31  =  0.45
r21  =  0.418788886612
r31  =  0.320048184979
shapiro_w  =  0.891307473183
skewness  =  -0.562131386986
slope_per10  =  -0.211494095806
slope_per90  =  0.276163679862
stetson_k  =  0.80635757628
weighted_mean  =  15.0271183206
weighted_std  =  0.283396875933
