-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.275471669203
cusum  =  0.283709793778
eta  =  1.91424127094
hl_amp_ratio  =  1.03340402357
kurtosis  =  -0.566355409009
n_points  =  84
period  =  0.647813278192
period_SNR  =  11.6495699013
period_log10FAP  =  -0.537413875542
period_uncertainty  =  0.000143522629789
phase_cusum  =  0.27472964012
phase_eta  =  1.72476647677
phi21  =  4.42458819679
phi31  =  3.73862104763
quartile31  =  0.575
r21  =  0.149660520286
r31  =  0.408983155158
shapiro_w  =  0.987877070904
skewness  =  0.0763483546758
slope_per10  =  -0.100435809218
slope_per90  =  0.0626960689191
stetson_k  =  0.789831561017
weighted_mean  =  19.8082717565
weighted_std  =  0.363004112592
