-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  LPV_Mira_AGB_C
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.47305026486
cusum  =  0.30940666568
eta  =  0.5110133044
hl_amp_ratio  =  0.724457468451
kurtosis  =  0.403535613442
n_points  =  268
period  =  369.9786125
period_SNR  =  24.3252812108
period_log10FAP  =  -18.6849128041
period_uncertainty  =  37.3715770202
phase_cusum  =  0.218023113286
phase_eta  =  0.465381162514
phi21  =  0.344055833616
phi31  =  -0.0719221983161
quartile31  =  0.5825
r21  =  0.275026374011
r31  =  0.145807400207
shapiro_w  =  0.948031067848
skewness  =  -0.709209740262
slope_per10  =  -4.55664336602
slope_per90  =  6.47960094114
stetson_k  =  0.783785005477
weighted_mean  =  11.2255264798
weighted_std  =  0.464404942085
