-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.354544414165
cusum  =  0.1735488109
eta  =  0.648207528105
hl_amp_ratio  =  0.49802698429
kurtosis  =  -0.6744106717
n_points  =  224
period  =  0.616589213467
period_SNR  =  34.6716370443
period_log10FAP  =  -28.3646141533
period_uncertainty  =  0.000130018115038
phase_cusum  =  0.354852092709
phase_eta  =  0.207681235247
phi21  =  0.923492262112
phi31  =  -1.04839714195
quartile31  =  0.4225
r21  =  0.430326783325
r31  =  0.278810587581
shapiro_w  =  0.928944647312
skewness  =  -0.581595907733
slope_per10  =  -0.28468819002
slope_per90  =  0.299250008538
stetson_k  =  0.777442144811
weighted_mean  =  15.6251942046
weighted_std  =  0.288079518226
