-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.318920594421
cusum  =  0.093306094178
eta  =  0.834722252092
hl_amp_ratio  =  0.370519124682
kurtosis  =  -0.124039840569
n_points  =  319
period  =  0.682479513965
period_SNR  =  41.8617208473
period_log10FAP  =  -33.9179990116
period_uncertainty  =  0.000133119984959
phase_cusum  =  0.306726942594
phase_eta  =  0.167894971286
phi21  =  4.07524378328
phi31  =  5.28163427445
quartile31  =  0.385
r21  =  0.501521926131
r31  =  0.321873756561
shapiro_w  =  0.903962254524
skewness  =  -0.873983864084
slope_per10  =  -0.19904837297
slope_per90  =  0.19061332971
stetson_k  =  0.695692021805
weighted_mean  =  15.287689917
weighted_std  =  0.269170629148
