-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.176866719363
cusum  =  0.146727269501
eta  =  0.529872609993
hl_amp_ratio  =  0.847799532337
kurtosis  =  -1.07627631483
n_points  =  393
period  =  0.60097681803
period_SNR  =  44.8700193936
period_log10FAP  =  -48.9825833157
period_uncertainty  =  0.000100336722671
phase_cusum  =  0.232543997565
phase_eta  =  0.384942071984
phi21  =  1.02132330829
phi31  =  -0.836245674839
quartile31  =  0.28
r21  =  0.365442112701
r31  =  0.26218272744
shapiro_w  =  0.95511329174
skewness  =  -0.243618960737
slope_per10  =  -0.118440707278
slope_per90  =  0.13568465037
stetson_k  =  0.869609264769
weighted_mean  =  13.9979475101
weighted_std  =  0.166358394923
