-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.173450021628
cusum  =  0.0983688302485
eta  =  0.505405039095
hl_amp_ratio  =  0.827180233115
kurtosis  =  -0.13145526852
n_points  =  334
period  =  0.363055151429
period_SNR  =  26.4853929892
period_log10FAP  =  -26.7884440927
period_uncertainty  =  3.67018959757e-05
phase_cusum  =  0.179938521747
phase_eta  =  1.07425599337
phi21  =  -0.880484562689
phi31  =  -3.71716226137
quartile31  =  0.24
r21  =  0.123406091858
r31  =  0.191802508834
shapiro_w  =  0.978716552258
skewness  =  -0.328183010426
slope_per10  =  -0.0325000952966
slope_per90  =  0.0558246495208
stetson_k  =  0.795004993348
weighted_mean  =  12.73078
weighted_std  =  0.192204036378
