-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.215787948457
cusum  =  0.118939203375
eta  =  0.432699029095
hl_amp_ratio  =  0.607150127796
kurtosis  =  -0.39681759077
n_points  =  374
period  =  0.604593243796
period_SNR  =  41.5403337912
period_log10FAP  =  -44.2430350275
period_uncertainty  =  0.000103053327309
phase_cusum  =  0.212489429827
phase_eta  =  0.522188598735
phi21  =  0.944098300303
phi31  =  1.93842631312
quartile31  =  0.2575
r21  =  0.377358953256
r31  =  0.191547958038
shapiro_w  =  0.939627885818
skewness  =  -0.637588408998
slope_per10  =  -0.10887250324
slope_per90  =  0.209781234027
stetson_k  =  0.824440573212
weighted_mean  =  13.1570855856
weighted_std  =  0.178914952541
