<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.257255265129
cusum  =  0.0954860944885
eta  =  0.596088965199
hl_amp_ratio  =  0.625600052293
kurtosis  =  -0.913279662278
n_points  =  333
period  =  0.674584050338
period_SNR  =  43.2098285047
period_log10FAP  =  -45.9833699943
period_uncertainty  =  0.000126696730746
phase_cusum  =  0.247066656108
phase_eta  =  0.133551889761
phi21  =  0.973912579194
phi31  =  2.27291433792
quartile31  =  0.35
r21  =  0.458220434981
r31  =  0.256002660648
shapiro_w  =  0.941092014313
skewness  =  -0.467668443999
slope_per10  =  -0.203614714412
slope_per90  =  0.245000002906
stetson_k  =  0.816640073293
weighted_mean  =  15.7548799795
weighted_std  =  0.218104597664
</pre></body></html>