-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.17148639991
cusum  =  0.104294002031
eta  =  0.683934484789
hl_amp_ratio  =  0.974759056618
kurtosis  =  -0.886053897737
n_points  =  310
period  =  0.618284021946
period_SNR  =  43.7989920448
period_log10FAP  =  -37.7996079019
period_uncertainty  =  0.000108715016229
phase_cusum  =  0.212498302061
phase_eta  =  0.339192058115
phi21  =  -2.20310475425
phi31  =  -0.768045756887
quartile31  =  0.27
r21  =  0.468879297905
r31  =  0.263672006995
shapiro_w  =  0.973243415356
skewness  =  -0.0320128009828
slope_per10  =  -0.207500540877
slope_per90  =  0.165350001771
stetson_k  =  0.863950446065
weighted_mean  =  15.1119748671
weighted_std  =  0.158341252848
