-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.231656587546
cusum  =  0.0734427260376
eta  =  0.532434172586
hl_amp_ratio  =  0.961653341292
kurtosis  =  -1.309013665
n_points  =  448
period  =  0.738027444124
period_SNR  =  52.8702368446
period_log10FAP  =  -62.4491209012
period_uncertainty  =  0.000152158064127
phase_cusum  =  0.253966424507
phase_eta  =  0.227547956754
phi21  =  1.04328678119
phi31  =  2.78271372137
quartile31  =  0.37
r21  =  0.416886329925
r31  =  0.24587097491
shapiro_w  =  0.942865848541
skewness  =  -0.0639242800854
slope_per10  =  -0.145782586864
slope_per90  =  0.184834471658
stetson_k  =  0.887324277135
weighted_mean  =  14.9449802992
weighted_std  =  0.20327031649
