-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.283638009821
cusum  =  0.172607849874
eta  =  0.697396851595
hl_amp_ratio  =  0.28490870878
kurtosis  =  -0.246083686559
n_points  =  311
period  =  0.486850216072
period_SNR  =  42.8005045814
period_log10FAP  =  -32.7139302408
period_uncertainty  =  0.000108460092169
phase_cusum  =  0.212295998128
phase_eta  =  0.517667468861
phi21  =  0.648609631482
phi31  =  1.80969876675
quartile31  =  0.36
r21  =  0.394780286779
r31  =  0.151834934083
shapiro_w  =  0.87050652504
skewness  =  -0.971434258907
slope_per10  =  -0.0898056846973
slope_per90  =  0.101291214254
stetson_k  =  0.673366506618
weighted_mean  =  15.1551087342
weighted_std  =  0.276216778608
