-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.71


######### Lightcurve features #########

amplitude  =  0.290995764425
cusum  =  0.116032515188
eta  =  0.715039760374
hl_amp_ratio  =  0.535858039368
kurtosis  =  -0.830311737628
n_points  =  269
period  =  0.558509151646
period_SNR  =  43.4725298218
period_log10FAP  =  -35.410508854
period_uncertainty  =  0.000124508415664
phase_cusum  =  0.311347851442
phase_eta  =  0.383754419008
phi21  =  1.10488423395
phi31  =  2.03133850089
quartile31  =  0.41
r21  =  0.253336212377
r31  =  0.266643669613
shapiro_w  =  0.951169908047
skewness  =  -0.450398123642
slope_per10  =  -0.111344170238
slope_per90  =  0.0949552204354
stetson_k  =  0.772777660409
weighted_mean  =  17.0077917345
weighted_std  =  0.261000280888
