-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.149855425184
cusum  =  0.0812099569981
eta  =  0.659535454899
hl_amp_ratio  =  0.773693378223
kurtosis  =  -1.04035169304
n_points  =  298
period  =  0.757304030379
period_SNR  =  50.6673681704
period_log10FAP  =  -45.1026955993
period_uncertainty  =  0.000196040402665
phase_cusum  =  0.316699297977
phase_eta  =  0.26039732813
phi21  =  -1.92644740574
phi31  =  -3.454726653
quartile31  =  0.1875
r21  =  0.344979215847
r31  =  0.128199764527
shapiro_w  =  0.961133599281
skewness  =  -0.240585747374
slope_per10  =  -0.282240002332
slope_per90  =  0.336041223154
stetson_k  =  0.84593197644
weighted_mean  =  14.6684695652
weighted_std  =  0.110539989178
