-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.67


######### Lightcurve features #########

amplitude  =  0.319344873649
cusum  =  0.260102757032
eta  =  1.73268593804
hl_amp_ratio  =  0.53869971746
kurtosis  =  -0.58490082517
n_points  =  46
period  =  0.207951869271
period_SNR  =  9.05308338839
period_log10FAP  =  0.0
period_uncertainty  =  3.05680805163e-05
phase_cusum  =  0.419417760267
phase_eta  =  1.43250750559
phi21  =  3.67737026112
phi31  =  3.24955844363
quartile31  =  0.47
r21  =  0.146515122323
r31  =  0.264833281432
shapiro_w  =  0.953398823738
skewness  =  -0.449894112102
slope_per10  =  -0.0864542515344
slope_per90  =  0.0705008057849
stetson_k  =  0.696599508203
weighted_mean  =  19.3323664885
weighted_std  =  0.3598106988
