-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.219243654422
cusum  =  0.205214616566
eta  =  0.457899840733
hl_amp_ratio  =  0.543880601337
kurtosis  =  -0.703788989937
n_points  =  157
period  =  0.589425933619
period_SNR  =  16.8983938925
period_log10FAP  =  -14.2212827452
period_uncertainty  =  0.000152464036684
phase_cusum  =  0.230763355979
phase_eta  =  0.276579324961
phi21  =  -2.30665657346
phi31  =  -4.07293179881
quartile31  =  0.29
r21  =  0.52895030957
r31  =  0.185787188136
shapiro_w  =  0.962855219841
skewness  =  -0.410284025025
slope_per10  =  -0.201499997638
slope_per90  =  0.28933333233
stetson_k  =  0.775140324361
weighted_mean  =  16.0884825859
weighted_std  =  0.210377382652
