<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.313066211106
cusum  =  0.280201860021
eta  =  0.508023723585
hl_amp_ratio  =  0.275728477364
kurtosis  =  -0.413456185024
n_points  =  224
period  =  0.551711618868
period_SNR  =  34.7013990956
period_log10FAP  =  -27.8331786161
period_uncertainty  =  8.67416564934e-05
phase_cusum  =  0.354475558929
phase_eta  =  0.222980045737
phi21  =  0.762614031154
phi31  =  -1.40856943688
quartile31  =  0.3625
r21  =  0.346890406455
r31  =  0.34811881471
shapiro_w  =  0.907126486301
skewness  =  -0.785207347926
slope_per10  =  -0.137059619089
slope_per90  =  0.228760372013
stetson_k  =  0.676603086444
weighted_mean  =  15.8991554256
weighted_std  =  0.272947655295
</pre></body></html>