-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.65


######### Lightcurve features #########

amplitude  =  0.449605991185
cusum  =  0.346770330709
eta  =  1.76917943749
hl_amp_ratio  =  0.67900348715
kurtosis  =  -0.10588160043
n_points  =  32
period  =  0.0903060125022
period_SNR  =  7.52175970929
period_log10FAP  =  0.0
period_uncertainty  =  4.3010543648e-06
phase_cusum  =  0.333868368063
phase_eta  =  1.14080913118
phi21  =  2.75566404408
phi31  =  4.04678983522
quartile31  =  0.4675
r21  =  0.215206552769
r31  =  0.129676212436
shapiro_w  =  0.981834709644
skewness  =  -0.228053747093
slope_per10  =  -0.0278687350794
slope_per90  =  0.038743926447
stetson_k  =  0.686956140523
weighted_mean  =  19.0872424137
weighted_std  =  0.400896304215
