<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.184300053341
cusum  =  0.185020932557
eta  =  0.573850215087
hl_amp_ratio  =  0.638606359034
kurtosis  =  -1.37629581824
n_points  =  269
period  =  0.358070730502
period_SNR  =  27.5000525887
period_log10FAP  =  -21.3020361876
period_uncertainty  =  7.31114719111e-05
phase_cusum  =  0.255791766881
phase_eta  =  0.734149620799
phi21  =  3.22720613481
phi31  =  3.81921742333
quartile31  =  0.34
r21  =  0.209662682359
r31  =  0.113105454031
shapiro_w  =  0.92278856039
skewness  =  -0.216256626853
slope_per10  =  -0.0776825745029
slope_per90  =  0.0479306787072
stetson_k  =  0.844154487678
weighted_mean  =  16.0144794752
weighted_std  =  0.179013714036
</pre></body></html>