-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.268354192653
cusum  =  0.173594452978
eta  =  0.540822329406
hl_amp_ratio  =  0.715827528465
kurtosis  =  -0.890232828135
n_points  =  304
period  =  0.708966379575
period_SNR  =  47.9561031804
period_log10FAP  =  -42.2983762576
period_uncertainty  =  0.000229197910007
phase_cusum  =  0.27416873716
phase_eta  =  0.153960639885
phi21  =  3.90087069165
phi31  =  2.12035525293
quartile31  =  0.3525
r21  =  0.40577778344
r31  =  0.298212726621
shapiro_w  =  0.959573984146
skewness  =  -0.342183240855
slope_per10  =  -0.191466066278
slope_per90  =  0.183656393713
stetson_k  =  0.836904161864
weighted_mean  =  15.1260733833
weighted_std  =  0.216158438367
