-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.30012165077
cusum  =  0.32359882188
eta  =  1.58646792865
hl_amp_ratio  =  0.943502312729
kurtosis  =  0.166270282238
n_points  =  47
period  =  0.202698686411
period_SNR  =  9.25356182279
period_log10FAP  =  -0.00128282519655
period_uncertainty  =  1.84799533268e-05
phase_cusum  =  0.422859403268
phase_eta  =  1.34097935342
phi21  =  -1.37426769907
phi31  =  -3.4165641596
quartile31  =  0.49
r21  =  0.203697431787
r31  =  0.105474275655
shapiro_w  =  0.984721422195
skewness  =  0.363679277292
slope_per10  =  -0.0494681887178
slope_per90  =  0.0492120536884
stetson_k  =  0.753950612996
weighted_mean  =  19.0912601235
weighted_std  =  0.330623255614
