-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.23


######### Lightcurve features #########

amplitude  =  0.0260514532423
cusum  =  0.178352351894
eta  =  1.09201955024
hl_amp_ratio  =  0.673871415856
kurtosis  =  7.10208952746
n_points  =  158
period  =  0.234033460421
period_SNR  =  8.39858454118
period_log10FAP  =  -1.97185468991
period_uncertainty  =  1.37379860425e-05
phase_cusum  =  0.169337500715
phase_eta  =  1.21142032111
phi21  =  2.86184121427
phi31  =  2.72900346348
quartile31  =  0.0275
r21  =  0.575639310944
r31  =  0.357379715567
shapiro_w  =  0.808856844902
skewness  =  -2.01448528028
slope_per10  =  -0.181806146922
slope_per90  =  0.320930285362
stetson_k  =  0.647375152727
weighted_mean  =  14.9129935337
weighted_std  =  0.0226298786432
