-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.288668963555
cusum  =  0.138750389679
eta  =  0.534756977796
hl_amp_ratio  =  0.505706515642
kurtosis  =  -1.00391086279
n_points  =  377
period  =  0.657827934061
period_SNR  =  48.703901369
period_log10FAP  =  -55.0663336938
period_uncertainty  =  0.00014083236228
phase_cusum  =  0.236459755402
phase_eta  =  0.16570708442
phi21  =  1.13444904924
phi31  =  -0.815939528403
quartile31  =  0.45
r21  =  0.486333239841
r31  =  0.26142573253
shapiro_w  =  0.91959798336
skewness  =  -0.529100567333
slope_per10  =  -0.114019753962
slope_per90  =  0.24684606893
stetson_k  =  0.806973727215
weighted_mean  =  13.360099278
weighted_std  =  0.264003967465
