-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.342117643021
cusum  =  0.101950765036
eta  =  0.526035681207
hl_amp_ratio  =  0.382083622697
kurtosis  =  -0.923149234931
n_points  =  400
period  =  0.552122378172
period_SNR  =  48.9867188931
period_log10FAP  =  -51.8274747662
period_uncertainty  =  0.000101786222013
phase_cusum  =  0.21177847912
phase_eta  =  0.374159272826
phi21  =  0.782307935705
phi31  =  1.82491324397
quartile31  =  0.52
r21  =  0.450766621294
r31  =  0.246643417609
shapiro_w  =  0.912075281143
skewness  =  -0.592273235577
slope_per10  =  -0.113543139334
slope_per90  =  0.0996246165578
stetson_k  =  0.759514052446
weighted_mean  =  16.1125646673
weighted_std  =  0.323895374623
