-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.23050726015
cusum  =  0.111758333315
eta  =  0.612613692913
hl_amp_ratio  =  0.636002399617
kurtosis  =  -0.792235047618
n_points  =  298
period  =  0.793518733577
period_SNR  =  33.7256513064
period_log10FAP  =  -38.1215335267
period_uncertainty  =  0.000217243690391
phase_cusum  =  0.257381427497
phase_eta  =  0.176931807396
phi21  =  -1.96217335621
phi31  =  -0.539198174158
quartile31  =  0.3
r21  =  0.544462254072
r31  =  0.25994589062
shapiro_w  =  0.956468403339
skewness  =  -0.428482588748
slope_per10  =  -0.189786887703
slope_per90  =  0.21499999566
stetson_k  =  0.808603751067
weighted_mean  =  14.6376434733
weighted_std  =  0.20360929516
