-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.304130435722
cusum  =  0.185759686644
eta  =  0.603675352172
hl_amp_ratio  =  0.660291619737
kurtosis  =  -0.962682776321
n_points  =  304
period  =  0.778190571125
period_SNR  =  46.387578693
period_log10FAP  =  -42.4277353612
period_uncertainty  =  0.000241609794483
phase_cusum  =  0.297356797491
phase_eta  =  0.0750609352519
phi21  =  -1.78933398429
phi31  =  -3.27198377181
quartile31  =  0.37
r21  =  0.462868230157
r31  =  0.236420889507
shapiro_w  =  0.960661530495
skewness  =  -0.278865715124
slope_per10  =  -0.1824851007
slope_per90  =  0.384783339687
stetson_k  =  0.843630974892
weighted_mean  =  13.5903861858
weighted_std  =  0.23534515648
