-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.280225919303
cusum  =  0.158761773493
eta  =  0.55616287497
hl_amp_ratio  =  0.602256957791
kurtosis  =  -0.282738111889
n_points  =  114
period  =  0.606220418916
period_SNR  =  11.3553302615
period_log10FAP  =  -8.37519912944
period_uncertainty  =  0.000115215987521
phase_cusum  =  0.271436530043
phase_eta  =  0.302087550048
phi21  =  -2.20858737353
phi31  =  -1.64979961554
quartile31  =  0.345
r21  =  0.459467114566
r31  =  0.526016419718
shapiro_w  =  0.934812903404
skewness  =  -0.681442709559
slope_per10  =  -0.295404704709
slope_per90  =  0.338899996132
stetson_k  =  0.767854558676
weighted_mean  =  15.2025950498
weighted_std  =  0.282408854316
