<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.297316942272
cusum  =  0.201713215262
eta  =  0.592312732438
hl_amp_ratio  =  0.255753072648
kurtosis  =  -0.741006108883
n_points  =  313
period  =  0.560060142721
period_SNR  =  47.3830854484
period_log10FAP  =  -40.8244281933
period_uncertainty  =  8.9204280766e-05
phase_cusum  =  0.348493614529
phase_eta  =  0.108828991135
phi21  =  0.691702484429
phi31  =  1.86177489131
quartile31  =  0.41
r21  =  0.445654969515
r31  =  0.340655083002
shapiro_w  =  0.902230739594
skewness  =  -0.683695958094
slope_per10  =  -0.127373013205
slope_per90  =  0.152271865151
stetson_k  =  0.689282133851
weighted_mean  =  15.6751160425
weighted_std  =  0.274961440739
</pre></body></html>