-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.251571892942
cusum  =  0.204221596704
eta  =  0.690306365876
hl_amp_ratio  =  1.25104043064
kurtosis  =  -0.886232860462
n_points  =  308
period  =  0.717276010808
period_SNR  =  42.7830885056
period_log10FAP  =  -33.9504213472
period_uncertainty  =  0.000234999121479
phase_cusum  =  0.212518428854
phase_eta  =  0.504582158073
phi21  =  1.19311843173
phi31  =  2.70488375849
quartile31  =  0.3325
r21  =  0.452287653245
r31  =  0.333927282706
shapiro_w  =  0.971067547798
skewness  =  0.249257004316
slope_per10  =  -0.118224618999
slope_per90  =  0.154690092395
stetson_k  =  0.845255543244
weighted_mean  =  13.7579024344
weighted_std  =  0.218072729461
