-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.185514141597
cusum  =  0.145300706692
eta  =  0.554548101832
hl_amp_ratio  =  0.820296633689
kurtosis  =  -0.657959836114
n_points  =  362
period  =  0.603170991028
period_SNR  =  48.9049074885
period_log10FAP  =  -44.9716554646
period_uncertainty  =  0.000102489466415
phase_cusum  =  0.256234311618
phase_eta  =  0.49965907607
phi21  =  1.01741812089
phi31  =  0.133116263313
quartile31  =  0.24
r21  =  0.314149649126
r31  =  0.0957916387581
shapiro_w  =  0.980898141861
skewness  =  -0.198550176637
slope_per10  =  -0.100869414148
slope_per90  =  0.0958687426614
stetson_k  =  0.817571426906
weighted_mean  =  13.2261926148
weighted_std  =  0.156304391173
