-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.269677367041
cusum  =  0.213938910654
eta  =  0.531962530702
hl_amp_ratio  =  0.207414039531
kurtosis  =  -0.826943143969
n_points  =  89
period  =  0.552898191613
period_SNR  =  15.4426376768
period_log10FAP  =  -8.46613102752
period_uncertainty  =  0.000150766438736
phase_cusum  =  0.306625407538
phase_eta  =  0.272110854388
phi21  =  0.966729073559
phi31  =  1.96406839048
quartile31  =  0.43
r21  =  0.442726672829
r31  =  0.398266456269
shapiro_w  =  0.870553970337
skewness  =  -0.734720998672
slope_per10  =  -0.274982101251
slope_per90  =  0.446819728311
stetson_k  =  0.677784253025
weighted_mean  =  14.7372190062
weighted_std  =  0.26243538624
