-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.337767802618
cusum  =  0.178538563888
eta  =  0.72147514832
hl_amp_ratio  =  0.370051663814
kurtosis  =  -0.28005690536
n_points  =  112
period  =  0.648382286683
period_SNR  =  15.069333004
period_log10FAP  =  -9.05695040759
period_uncertainty  =  0.000122128896155
phase_cusum  =  0.194751230215
phase_eta  =  0.442826731937
phi21  =  -2.29677462207
phi31  =  -1.08082900709
quartile31  =  0.39
r21  =  0.580688149474
r31  =  0.336489485109
shapiro_w  =  0.899666547775
skewness  =  -0.788077557327
slope_per10  =  -0.316366671274
slope_per90  =  0.472320424611
stetson_k  =  0.671051295297
weighted_mean  =  15.8211122716
weighted_std  =  0.327389757218
