-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.379502974167
cusum  =  0.159334115925
eta  =  0.53301870037
hl_amp_ratio  =  0.47865438532
kurtosis  =  -0.747253107072
n_points  =  231
period  =  0.577702338228
period_SNR  =  28.5408016741
period_log10FAP  =  -25.2117368492
period_uncertainty  =  0.000101465216267
phase_cusum  =  0.28777359946
phase_eta  =  0.138486696634
phi21  =  -2.31879465987
phi31  =  -1.23491378628
quartile31  =  0.55
r21  =  0.546037556786
r31  =  0.349522457673
shapiro_w  =  0.910922169685
skewness  =  -0.673556764059
slope_per10  =  -0.154377174529
slope_per90  =  0.278910532327
stetson_k  =  0.766891085271
weighted_mean  =  13.4729501695
weighted_std  =  0.351022768082
