<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  1.40967427818
cusum  =  0.213952889567
eta  =  1.65154396279
hl_amp_ratio  =  1.59497584173
kurtosis  =  -0.549088744577
n_points  =  29
period  =  0.575872357085
period_SNR  =  8.03229267185
period_log10FAP  =  -0.690184389449
period_uncertainty  =  0.000184426714539
phase_cusum  =  0.33341992275
phase_eta  =  0.94956608318
phi21  =  -2.84768622214
phi31  =  -2.57894641965
quartile31  =  0.17
r21  =  0.468718262319
r31  =  0.107681440412
shapiro_w  =  0.969967722893
skewness  =  0.459814466184
slope_per10  =  -0.361474996898
slope_per90  =  0.50376213665
stetson_k  =  0.848743710629
weighted_mean  =  15.4676339221
weighted_std  =  0.105868441387
</pre></body></html>