-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.418886624411
cusum  =  0.237984560043
eta  =  0.414672573137
hl_amp_ratio  =  0.35493098154
kurtosis  =  0.139138840548
n_points  =  139
period  =  0.511809177755
period_SNR  =  13.8495189831
period_log10FAP  =  -10.8446761524
period_uncertainty  =  0.000137468151769
phase_cusum  =  0.302199388507
phase_eta  =  0.120960575342
phi21  =  -2.53638108474
phi31  =  -1.74082386076
quartile31  =  0.395
r21  =  0.488102826619
r31  =  0.35771263699
shapiro_w  =  0.853302061558
skewness  =  -1.10572066256
slope_per10  =  -0.184538122094
slope_per90  =  0.236729110083
stetson_k  =  0.679111966454
weighted_mean  =  15.336115232
weighted_std  =  0.371896667158
