-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.197219375372
cusum  =  0.0972747418779
eta  =  0.562799669935
hl_amp_ratio  =  0.837700294291
kurtosis  =  -0.792910780025
n_points  =  464
period  =  0.632375336489
period_SNR  =  58.9044543508
period_log10FAP  =  -67.4150035071
period_uncertainty  =  0.000108461744365
phase_cusum  =  0.284408394921
phase_eta  =  0.177942328709
phi21  =  -1.8720172068
phi31  =  -3.49585476977
quartile31  =  0.26
r21  =  0.437712634159
r31  =  0.193853806131
shapiro_w  =  0.978840410709
skewness  =  -0.0947938091271
slope_per10  =  -0.14402260214
slope_per90  =  0.15349508499
stetson_k  =  0.849326969626
weighted_mean  =  14.5542466937
weighted_std  =  0.156560083955
