-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.178089159689
cusum  =  0.102075718208
eta  =  0.585050341362
hl_amp_ratio  =  0.78096200553
kurtosis  =  -0.999050504777
n_points  =  372
period  =  0.739179723388
period_SNR  =  48.3876826619
period_log10FAP  =  -50.6579886062
period_uncertainty  =  0.000152144688261
phase_cusum  =  0.259811142747
phase_eta  =  0.175859639162
phi21  =  1.0428391043
phi31  =  2.47456210073
quartile31  =  0.25
r21  =  0.471353562208
r31  =  0.291193516706
shapiro_w  =  0.971341729164
skewness  =  -0.147035355521
slope_per10  =  -0.210428205024
slope_per90  =  0.194569668575
stetson_k  =  0.835098969934
weighted_mean  =  16.7134170886
weighted_std  =  0.15497600257
