-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.340365743259
cusum  =  0.191552815103
eta  =  0.590260356221
hl_amp_ratio  =  0.470124166985
kurtosis  =  -0.119192248648
n_points  =  181
period  =  0.508490800051
period_SNR  =  23.9801779841
period_log10FAP  =  -17.9209427959
period_uncertainty  =  0.000112668895384
phase_cusum  =  0.288181980302
phase_eta  =  0.521862655948
phi21  =  0.439375458459
phi31  =  1.63751880648
quartile31  =  0.42
r21  =  0.388444660294
r31  =  0.177597980895
shapiro_w  =  0.919892728329
skewness  =  -0.82315789953
slope_per10  =  -0.172999990173
slope_per90  =  0.169589100403
stetson_k  =  0.716815085126
weighted_mean  =  15.7508057974
weighted_std  =  0.294363868056
