-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.235913821852
cusum  =  0.0814897846039
eta  =  0.590475528227
hl_amp_ratio  =  0.472978487664
kurtosis  =  -0.718363321202
n_points  =  596
period  =  0.60532443793
period_SNR  =  42.0882125293
period_log10FAP  =  -80.5075312513
period_uncertainty  =  0.000101982016043
phase_cusum  =  0.269256738978
phase_eta  =  0.113599055818
phi21  =  -2.22784123646
phi31  =  -4.28147553358
quartile31  =  0.32
r21  =  0.473251868349
r31  =  0.367828325778
shapiro_w  =  0.939422428608
skewness  =  -0.543155353656
slope_per10  =  -0.0814854948247
slope_per90  =  0.126155571217
stetson_k  =  0.777165088491
weighted_mean  =  14.222955233
weighted_std  =  0.193554449056
