-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.449585555416
cusum  =  0.445938654535
eta  =  0.496166491082
hl_amp_ratio  =  0.347157225556
kurtosis  =  -0.790295872551
n_points  =  25
period  =  1.02397137113
period_SNR  =  6.14992951242
period_log10FAP  =  -0.0780809760587
period_uncertainty  =  0.000578123128133
phase_cusum  =  0.371697778924
phase_eta  =  0.591600383549
phi21  =  1.50580853007
phi31  =  0.0691244209157
quartile31  =  0.37
r21  =  0.0873377137292
r31  =  0.19897769883
shapiro_w  =  0.809429824352
skewness  =  -0.870692107505
slope_per10  =  -0.412829190309
slope_per90  =  0.447500008158
stetson_k  =  0.640895999144
weighted_mean  =  15.4733665393
weighted_std  =  0.289077324794
