<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.241745650287
cusum  =  0.13653446806
eta  =  0.555928687245
hl_amp_ratio  =  0.47269660029
kurtosis  =  -0.959314879268
n_points  =  382
period  =  0.629595076783
period_SNR  =  45.0099256329
period_log10FAP  =  -48.0756641107
period_uncertainty  =  0.000110377821767
phase_cusum  =  0.25338508302
phase_eta  =  0.209479742845
phi21  =  1.14083002429
phi31  =  2.30981652668
quartile31  =  0.33
r21  =  0.479348512371
r31  =  0.260353517378
shapiro_w  =  0.935866415501
skewness  =  -0.47353701794
slope_per10  =  -0.090620783224
slope_per90  =  0.166782987397
stetson_k  =  0.784965561628
weighted_mean  =  15.9930379584
weighted_std  =  0.21942145235
</pre></body></html>