-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.47


######### Lightcurve features #########

amplitude  =  0.252026211545
cusum  =  0.230219152951
eta  =  0.558021032149
hl_amp_ratio  =  0.469265067896
kurtosis  =  0.874974324308
n_points  =  114
period  =  0.878747111883
period_SNR  =  15.1427457929
period_log10FAP  =  -10.8989307615
period_uncertainty  =  0.000206181876661
phase_cusum  =  0.327763566885
phase_eta  =  0.458089391497
phi21  =  1.16131462923
phi31  =  1.96982430042
quartile31  =  0.285
r21  =  0.26973258632
r31  =  0.284634785575
shapiro_w  =  0.924238920212
skewness  =  -0.992208200229
slope_per10  =  -0.261579935503
slope_per90  =  0.524800005369
stetson_k  =  0.759277715899
weighted_mean  =  11.0537719298
weighted_std  =  0.221134992315
