-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.170008620344
cusum  =  0.15773524007
eta  =  0.519140542972
hl_amp_ratio  =  0.860907712175
kurtosis  =  -1.24146635001
n_points  =  392
period  =  0.671759291215
period_SNR  =  52.9806305879
period_log10FAP  =  -57.8219847472
period_uncertainty  =  0.000125553101402
phase_cusum  =  0.298567051264
phase_eta  =  0.13921674556
phi21  =  1.245944005
phi31  =  2.99463999906
quartile31  =  0.26
r21  =  0.441840891241
r31  =  0.173925875175
shapiro_w  =  0.949729979038
skewness  =  -0.0393801695721
slope_per10  =  -0.185542667628
slope_per90  =  0.158500000834
stetson_k  =  0.858006827933
weighted_mean  =  15.9539900723
weighted_std  =  0.143793293937
