-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.302122957951
cusum  =  0.154201984527
eta  =  1.32615751409
hl_amp_ratio  =  0.516199618168
kurtosis  =  2.47574415333
n_points  =  113
period  =  0.540945637282
period_SNR  =  10.5105362596
period_log10FAP  =  -4.03185054283
period_uncertainty  =  0.000187178442716
phase_cusum  =  0.226530485827
phase_eta  =  0.428823094573
phi21  =  -2.2070649272
phi31  =  -4.27962922893
quartile31  =  0.15
r21  =  0.554645134858
r31  =  0.297159885878
shapiro_w  =  0.884109914303
skewness  =  -0.867683270563
slope_per10  =  -0.284198504336
slope_per90  =  0.482052298345
stetson_k  =  0.632711734666
weighted_mean  =  15.274244489
weighted_std  =  0.196193730906
