<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.236902068983
cusum  =  0.154088905192
eta  =  0.533375734673
hl_amp_ratio  =  0.841263795791
kurtosis  =  -0.992630326986
n_points  =  214
period  =  0.718574241541
period_SNR  =  26.4550626513
period_log10FAP  =  -25.79165751
period_uncertainty  =  0.00013784804077
phase_cusum  =  0.276787325776
phase_eta  =  0.0530108640973
phi21  =  -2.25087741571
phi31  =  -0.778982707358
quartile31  =  0.3475
r21  =  0.542974676432
r31  =  0.347547427486
shapiro_w  =  0.970471918583
skewness  =  -0.134022518868
slope_per10  =  -0.238773221237
slope_per90  =  0.429691017967
stetson_k  =  0.849348337243
weighted_mean  =  13.8131512272
weighted_std  =  0.203434987729
</pre></body></html>